{/* Start Python Security Options */}
### Per-Client Security Schemes

This SDK supports the following security scheme globally:



To authenticate with the API the `access_token` parameter must be set when initializing the SDK client instance. For example:
```python
import plex_api

s = plex_api.PlexAPI(
    access_token="<YOUR_API_KEY_HERE>",
    x_plex_client_identifier='<value>',
)


res = s.server.get_server_capabilities()

if res.object is not None:
    # handle response
    pass

```
{/* End Python Security Options */}
